noise FE1.1 set 2C

Cin (pF)

ENC (e-)

428.6 + 47 e/pF _____ NIKHEF 510 + 42.4 e/pF - - - - Zurich 526.5 + 41.5 e/pF . . . . Heidelberg

0

500

1000

1500

2000

2500

3000

3500

0 10 20 30 40 50 60