FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C Zurich NIKHEF Heidelberg Ipre 600 600 600 Isha 80 80 80 Ibuf 200 640 80 Vfp 0 0 0 Vfs 0 0 0

Zurich NIKHEF NIKHEF Heidelberg Heidelberg Cload Ctot rise time [ns] Ctot rise time [ns] Ctot rise time [ns] 0.0 4.02 9.7 3.0 10.7 2.0 7.90 4.8 8.82 10.0 7.7 10.9 5.0 8.48 10.2 14.22 10.2 13.0 11.4 12.0 9.64 22.4 26.42 11.4 18.0 12.2 22.0 11.00 32.7 36.72 12.8 18.0 12.0 32.0 12.06 48.5 52.52 13.8 25.0 12.4 42.0 12.58 36.0 13.1

Zurich pulse Zurich Zurich NIKHEF NIKHEF H’berg H’berg Cload Ctot height [mV] Ctot Gain[μV/e] Ctot Gain[μV/e] Ctot Gain[μV/e] 0 4.02 37.1 4.02 1.66 3.0 1.68 2.0 2.15 4.8 8.82 33.2 8.82 1.49 7.7 1.62 5.0 2.05 10.2 14.22 30.2 14.22 1.35 13.0 1.52 12.0 1.83 22.4 26.42 23.9 26.42 1.07 18.0 1.36 22.0 1.58 32.7 36.72 20.6 36.72 0.92 18.0 1.36 32.0 1.4 48.5 52.52 17.0 52.52 0.76 25.0 1.28 42.0 1.29 36.0 1.06

Zurich NIKHEF NIKHEF Heidelberg Heidelberg Cload Ctot overspill@25 ns Ctot overspill@25 ns Ctot overspill@25 ns 0 4.02 9 3.0 2 2.0 7.9 4.8 8.82 13 7.7 5 5.0 10.7 10.2 14.22 13 13.0 9 12.0 17.3 22.4 26.42 31 18.0 15 22.0 24.8 32.7 36.72 37 18.0 15 32.0 31.6 48.5 52.52 38 25.0 17 42.0 36.1 36.0 28

ENC ENC ENC ENC ENC ENC Zurich Zurich NIKHEF NIKHEF Heidelberg Heidelberg Ctot Ctot Ctot 4.02 642 3.0 599 2.0 617.1 8.82 821 7.7 781 5.0 714.3 14.22 1120 13.0 1012 12.0 980.5 26.42 1741 18.0 1287 22.0 1496.6 36.72 2165 18.0 1281 32.0 1968.3 52.52 2628 25.0 1568 42.0 2183.4 36.0 2146

FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C FE1.1 set 2C